h_radlen_SFMO_phi

Entries 85773 Mean 0.003188 RMS 1.131

phi [deg]

-150 -100 -50 0 50 100 150

0χL/

0 0.005

0.01

0.015

0.02

0.025

0.03

0.035

0.04

Depth vs phi [SFMO]^{h_radlen_SFMO_eta}_{Entries 36000}

Mean -0.00346 RMS 1.296

η -5 -4 -3 -2 -1 0 1 2 3 4 5

0χL/

0 0.02

0.04

0.06

0.08 0.1 0.12

0.14

0.16

0.18 0.2 0.22

h_radlen_SFMO_eta

Entries 36000

Depth vs eta [SFMO]^{h_radlen_SFMO_r}_{Entries 85773}

Mean 25.37 RMS 2.336

r [cm]

0 5 10 15 20 25 30 35 40

0χL/

0

0.02

0.04

0.06

0.08

0.1

0.12

h_radlen_SFMO_r

Entries 85773

Depth vs r [SFMO]^{h_radlen_SFMO_z}_{Entries 85773}

Mean -0.09644 RMS 35.22

z [cm]

-60 -40 -20 0 20 40 60

0χL/

0 0.02

0.04

0.06

0.08

0.1 0.12

h_radlen_SFMO_z Entries 85773

Depth vs z [SFMO]

h_radlen_PXMO_phi

Entries 88162 Mean 0.001551 RMS 1.115

phi [deg]

-150 -100 -50 0 50 100 150

0χL/

0

0.001

0.002

0.003

0.004

0.005

Depth vs phi [PXMO]^{h_radlen_PXMO_eta}_{Entries 36000}

Mean 0.002133 RMS 1.285

η -5 -4 -3 -2 -1 0 1 2 3 4 5

0χL/

0 0.002

0.004

0.006

0.008

0.01

0.012

h_radlen_PXMO_eta

Entries 36000

Depth vs eta [PXMO]^{h_radlen_PXMO_r}_{Entries 88162}

Mean 4.578 RMS 2.831

r [cm]

0 2 4 6 8 10 12 14 16

0χL/

0

0.001

0.002

0.003

0.004

0.005

0.006

h_radlen_PXMO_r

Entries 88162

Depth vs r [PXMO]^{h_radlen_PXMO_z}_{Entries 88162}

Mean -0.006334 RMS 6.52

z [cm]

-40 -30 -20 -10 0 10 20 30 40

0χL/

0 0.001

0.002

0.003

0.004

0.005

0.006

0.007

0.008

h_radlen_PXMO_z Entries 88162

Depth vs z [PXMO]

h_radlen_IBMO_phi

Entries 39732 Mean 0.0005599 RMS 1.119

phi [deg]

-150 -100 -50 0 50 100 150

0χL/

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

Depth vs phi [IBMO]^{h_radlen_IBMO_eta}_{Entries 36000}

Mean -0.000115 RMS 0.8296

η -5 -4 -3 -2 -1 0 1 2 3 4 5

0χL/

0

0.005

0.01

0.015

0.02

0.025

h_radlen_IBMO_eta

Entries 36000

Depth vs eta [IBMO]^{h_radlen_IBMO_r}_{Entries 39732}

Mean 14.09 RMS 0.491

r [cm]

0 2 4 6 8 10 12 14 16 18 20

0χL/

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

h_radlen_IBMO_r

Entries 39732

Depth vs r [IBMO]^{h_radlen_IBMO_z}_{Entries 39732}

Mean -0.002026 RMS 15.83

z [cm]

-40 -30 -20 -10 0 10 20 30 40

0χL/

0 0.002

0.004

0.006

0.008

0.01

0.012

0.014

0.016

0.018

0.02

h_radlen_IBMO_z Entries 39732

Depth vs z [IBMO]